From 95041dffbd23fe81802efd5fb25cffe492cdb551 Mon Sep 17 00:00:00 2001
From: Noah Loomans <noahloomans@gmail.com>
Date: Sat, 6 Jan 2018 12:11:05 +0100
Subject: Revert "Add strict typing"

This reverts commit 4ca30295d7d9f3dd7ba2e105952ff627f6b702a4.
---
 src/client/react/components/presentational/IconFromUserType.tsx | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/client/react/components/presentational/IconFromUserType.tsx')

diff --git a/src/client/react/components/presentational/IconFromUserType.tsx b/src/client/react/components/presentational/IconFromUserType.tsx
index 83af34c..d77ea1b 100644
--- a/src/client/react/components/presentational/IconFromUserType.tsx
+++ b/src/client/react/components/presentational/IconFromUserType.tsx
@@ -9,7 +9,7 @@ import TeacherIcon = require('react-icons/lib/md/account-circle');
 //   defaultIcon?: JSX.Element,
 // }
 
-const IconFromUserType: React.StatelessComponent<{ userType?: string, defaultIcon?: JSX.Element }> = (props) => {
+const IconFromUserType: React.StatelessComponent<{ userType: string, defaultIcon?: JSX.Element }> = (props) => {
   switch (props.userType) {
     case 'c':
       return <ClassIcon />;
-- 
cgit v1.1

